\documentclass[12pt,a4paper]{article}
\begin{document}
\begin{table}[ht]
\begin{center}
\caption{All statistics are based on contigs of size $\geq$ 500 bp, unless otherwise noted (e.g., "\# contigs ($\geq$ 0 bp)" and "Total length ($\geq$ 0 bp)" include all contigs).}
\begin{tabular}{|l*{22}{|r}|}
\hline
Assembly & \# contigs ($\geq$ 0 bp) & \# contigs ($\geq$ 1000 bp) & \# contigs ($\geq$ 5000 bp) & \# contigs ($\geq$ 10000 bp) & \# contigs ($\geq$ 25000 bp) & \# contigs ($\geq$ 50000 bp) & Total length ($\geq$ 0 bp) & Total length ($\geq$ 1000 bp) & Total length ($\geq$ 5000 bp) & Total length ($\geq$ 10000 bp) & Total length ($\geq$ 25000 bp) & Total length ($\geq$ 50000 bp) & \# contigs & Largest contig & Total length & GC (\%) & N50 & N90 & auN & L50 & L90 & \# N's per 100 kbp \\ \hline
E2348-69 & 2442 & 156 & 74 & 64 & 47 & 26 & 5791762 & 5047942 & 4913543 & 4845903 & 4552658 & 3757801 & 395 & 300313 & 5202412 & 50.52 & 135065 & 20674 & 137006.7 & 13 & 53 & 6.21 \\ \hline
\end{tabular}
\end{center}
\end{table}
\end{document}
